SAS/ENGLISH software is a portable natural language interface forqueryingand reportinginformationcontained inany data formataccessible by the SAS System. Specifically,SAS/ENGLISHsoftware translates typed Englishqueries intoStructured Query Language (SQL)commands and presents retrieved data or answers to the user. The functionofa natural language interface such as SAS/ENGLISHsoftware is to provideeasy access to data withouthavingto learn the syntax ofa retrievallanguage, and withouthavingto knowthe structure and fieldnames ofindividualdata values. WithSAS/ENGLISHsoftware, users can use simple Englishcommands to retrieve informationfromSAS data sets and external data bases.